/*
 Navicat Premium Data Transfer

 Source Server         : mongodb-106
 Source Server Type    : MongoDB
 Source Server Version : 50020
 Source Host           : 116.236.50.106:37027
 Source Schema         : cabinet_device

 Target Server Type    : MongoDB
 Target Server Version : 50020
 File Encoding         : 65001

 Date: 05/01/2024 16:28:12
*/


// ----------------------------
// Collection structure for IEMS2-AppConfig
// ----------------------------
db.getCollection("IEMS2-AppConfig").drop();
db.createCollection("IEMS2-AppConfig");

// ----------------------------
// Collection structure for IEMS2-deviceDictionary
// ----------------------------
db.getCollection("IEMS2-deviceDictionary").drop();
db.createCollection("IEMS2-deviceDictionary");

// ----------------------------
// Collection structure for IEMS2-deviceStatus
// ----------------------------
db.getCollection("IEMS2-deviceStatus").drop();
db.createCollection("IEMS2-deviceStatus");

// ----------------------------
// Collection structure for IEMS2-screenBattery
// ----------------------------
db.getCollection("IEMS2-screenBattery").drop();
db.createCollection("IEMS2-screenBattery");

// ----------------------------
// Collection structure for IEMS2-screenPower
// ----------------------------
db.getCollection("IEMS2-screenPower").drop();
db.createCollection("IEMS2-screenPower");

// ----------------------------
// Collection structure for IEMS2-screenRectify
// ----------------------------
db.getCollection("IEMS2-screenRectify").drop();
db.createCollection("IEMS2-screenRectify");

// ----------------------------
// Collection structure for IEMS2-screenSensor
// ----------------------------
db.getCollection("IEMS2-screenSensor").drop();
db.createCollection("IEMS2-screenSensor");

// ----------------------------
// Collection structure for IEMS2-snmpParam
// ----------------------------
db.getCollection("IEMS2-snmpParam").drop();
db.createCollection("IEMS2-snmpParam");


