/*
 Navicat Premium Data Transfer

 Source Server         : 127.0.0.1_mysql
 Source Server Type    : MySQL
 Source Server Version : 50741 (5.7.41-log)
 Source Host           : localhost:3306
 Source Schema         : hjems

 Target Server Type    : MySQL
 Target Server Version : 50741 (5.7.41-log)
 File Encoding         : 65001

 Date: 03/12/2024 22:03:39
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for tbl_device
-- ----------------------------
DROP TABLE IF EXISTS `tbl_device`;
CREATE TABLE `tbl_device`  (
  `device_id` int(11) NOT NULL,
  `device_name` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL,
  PRIMARY KEY (`device_id`) USING BTREE
) ENGINE = MyISAM CHARACTER SET = utf8 COLLATE = utf8_general_ci ROW_FORMAT = DYNAMIC;

-- ----------------------------
-- Records of tbl_device
-- ----------------------------
INSERT INTO `tbl_device` VALUES (1, '高压配电');
INSERT INTO `tbl_device` VALUES (2, '低压配电（交流配电箱）');
INSERT INTO `tbl_device` VALUES (3, '交流配电屏');
INSERT INTO `tbl_device` VALUES (4, '直流配电屏');
INSERT INTO `tbl_device` VALUES (5, '柴油发电机组');
INSERT INTO `tbl_device` VALUES (6, '开关电源');
INSERT INTO `tbl_device` VALUES (7, '蓄电池组');
INSERT INTO `tbl_device` VALUES (8, 'UPS设备');
INSERT INTO `tbl_device` VALUES (9, 'UPS配电屏');
INSERT INTO `tbl_device` VALUES (10, 'UPS电池');
INSERT INTO `tbl_device` VALUES (11, '240V直流系统');
INSERT INTO `tbl_device` VALUES (12, '专用空调(风冷)');
INSERT INTO `tbl_device` VALUES (13, '中央空调(水冷)');
INSERT INTO `tbl_device` VALUES (14, '专用空调（通冷冻水型）');
INSERT INTO `tbl_device` VALUES (15, '普通空调');
INSERT INTO `tbl_device` VALUES (16, '智能电表（交流）');
INSERT INTO `tbl_device` VALUES (17, '门禁系统');
INSERT INTO `tbl_device` VALUES (18, '机房/基站环境');
INSERT INTO `tbl_device` VALUES (19, '监控设备');
INSERT INTO `tbl_device` VALUES (20, '新能源供电系统（太阳能、风能）');
INSERT INTO `tbl_device` VALUES (21, '燃气轮机发电机组');
INSERT INTO `tbl_device` VALUES (22, '风力发电设备');
INSERT INTO `tbl_device` VALUES (23, '智能通风系统');
INSERT INTO `tbl_device` VALUES (24, '新风设备');
INSERT INTO `tbl_device` VALUES (25, '热交换设备');
INSERT INTO `tbl_device` VALUES (26, '热管设备');
INSERT INTO `tbl_device` VALUES (27, '蓄电池温控柜');
INSERT INTO `tbl_device` VALUES (28, '防雷设备/防雷箱');
INSERT INTO `tbl_device` VALUES (29, '燃料电池');
INSERT INTO `tbl_device` VALUES (30, '模块化UPS');
INSERT INTO `tbl_device` VALUES (31, '240V电池');
INSERT INTO `tbl_device` VALUES (32, '铁锂电池');
INSERT INTO `tbl_device` VALUES (33, '逆变器');
INSERT INTO `tbl_device` VALUES (34, '280V直流远供系统-局端升压');
INSERT INTO `tbl_device` VALUES (35, '280V直流远供系统-远端降压');
INSERT INTO `tbl_device` VALUES (36, '智能电表（直流）');
INSERT INTO `tbl_device` VALUES (37, '铁塔');
INSERT INTO `tbl_device` VALUES (38, '智能动环监控设备（FSU）');
INSERT INTO `tbl_device` VALUES (39, 'reserved');
INSERT INTO `tbl_device` VALUES (40, 'reserved');
INSERT INTO `tbl_device` VALUES (81, '智能温湿度传感器');
INSERT INTO `tbl_device` VALUES (85, 'HJWL门磁烟感水浸传感器');
INSERT INTO `tbl_device` VALUES (98, 'FSU设备');
INSERT INTO `tbl_device` VALUES (99, '非智能门禁');

SET FOREIGN_KEY_CHECKS = 1;
