/*
 Navicat Premium Data Transfer

 Source Server         : vitual-box-mysql-5.1.51
 Source Server Type    : MySQL
 Source Server Version : 50151 (5.1.51-log)
 Source Host           : 192.168.4.254:3306
 Source Schema         : hjems

 Target Server Type    : MySQL
 Target Server Version : 50151 (5.1.51-log)
 File Encoding         : 65001

 Date: 31/05/2024 15:41:41
*/

SET NAMES utf8;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for tbl_topic
-- ----------------------------
DROP TABLE IF EXISTS `tbl_topic`;
CREATE TABLE `tbl_topic`  (
  `topic_id` int(11) NOT NULL,
  `topic` varchar(255) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL,
  PRIMARY KEY (`topic_id`) USING BTREE
) ENGINE = MyISAM CHARACTER SET = utf8 COLLATE = utf8_general_ci ROW_FORMAT = Dynamic;

-- ----------------------------
-- Records of tbl_topic
-- ----------------------------
INSERT INTO `tbl_topic` VALUES (0, 'GateWayPublicTopic_Server');
INSERT INTO `tbl_topic` VALUES (1, 'ServerPublicTopic_GateWay');

SET FOREIGN_KEY_CHECKS = 1;
