/*
 Navicat Premium Data Transfer

 Source Server         : vitual-box-mysql-5.1.51
 Source Server Type    : MySQL
 Source Server Version : 50151 (5.1.51-log)
 Source Host           : 192.168.4.254:3306
 Source Schema         : hjems

 Target Server Type    : MySQL
 Target Server Version : 50151 (5.1.51-log)
 File Encoding         : 65001

 Date: 29/05/2024 17:31:44
*/

SET NAMES utf8;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for tbl_data
-- ----------------------------
DROP TABLE IF EXISTS `tbl_data`;
CREATE TABLE `tbl_data`  (
  `data_timestamp` varchar(25) CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL DEFAULT '0000-00-00 00:00:00.000',
  `data_type` varchar(32) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL,
  `FsuCode` varchar(20) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL,
  `data_content` blob NULL,
  `topic` tinyint(4) NULL DEFAULT 0,
  `device_id` decimal(10, 2) NULL DEFAULT NULL,
  PRIMARY KEY (`data_timestamp`) USING BTREE
) ENGINE = MyISAM CHARACTER SET = utf8 COLLATE = utf8_general_ci ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
